-0.003 -0.002 -0.001 0 0.001 0.002 0.003

-0.003

-0.002

-0.001

0

0.001

0.002

0.003

Istogramma 2D h4_{Entries 10000}

Mean x 8.693e-07 Mean y 4.292e-06 RMS x 0.000552 RMS y 0.0005541

Istogramma 2D