Table 1. Percentage of Fake Stars Lost

Non-shell Stars  Shell Stars
Mag F336W F555W F814W  F336W F555W F814W
20.25 2.2±7.4  ⋯  ⋯  0.9±6.8  ⋯ 0.0±44.7
20.75 2.4±7.8  ⋯ 2.8±7.4  1.7±6.6  ⋯ 1.4±6.7
21.25 0.1±7.7  ⋯ 1.7±7.6  2.6±6.5  ⋯ 0.9±6.6
21.75 2.4±4.5 2.2±7.4 0.1±7.6  7.1±4.5 0.9±6.8 3.3±6.5
22.25 3.4±3.1 1.8±7.7 2.9±4.4  11.8±3.6 0.4±6.6 5.7±4.4
22.75 4.5±2.9 1.8±7.7 4.7±3.1  26.2±3.6 3.4±6.5 10.9±3.6
23.25 7.0±2.4 3.4±4.5 3.7±2.9  44.2±3.3 10.7±4.5 20.6±3.5

More Data

23.75 12.4±2.7 4.1±3.1 6.7±2.5  59.8±4.0 20.1±3.6 32.6±3.4
24.25 30.2±3.1 5.3±2.9 10.0±2.7  74.9±5.1 35.8±3.6 43.1±4.0
24.75 66.8±5.5 10.4±2.4 16.5±3.2  83.7±6.1 56.3±3.3 57.0±5.2
25.25 87.5±35.4 20.0±2.7 28.0±5.6  ⋯ 71.5±4.0 71.8±6.2
25.75  ⋯  55.3±3.1  ⋯  ⋯ 81.2±5.1  ⋯
26.25  ⋯  85.1±5.5  ⋯  ⋯ 85.6±6.1  ⋯

More Data

27.75 12.4±2.7 4.1±3.1 6.7±2.5  59.8±4.0 20.1±3.6 32.6±3.4
28.25 30.2±3.1 5.3±2.9 10.0±2.7  74.9±5.1 35.8±3.6 43.1±4.0
29.75 66.8±5.5 10.4±2.4 16.5±3.2  83.7±6.1 56.3±3.3 57.0±5.2

Table 1—Continued

Non-shell Stars  Shell Stars
Mag F336W F555W F814W  F336W F555W F814W
30.25 87.5±35.4 20.0±2.7 28.0±5.6  ⋯ 71.5±4.0 71.8±6.2
31.75  ⋯  55.3±3.1  ⋯  ⋯ 81.2±5.1  ⋯
32.25  ⋯  85.1±5.5  ⋯  ⋯ 85.6±6.1  ⋯
33.75 12.4±2.7 4.1±3.1 6.7±2.5  59.8±4.0 20.1±3.6 32.6±3.4
34.25 30.2±3.1 5.3±2.9 10.0±2.7  74.9±5.1 35.8±3.6 43.1±4.0
35.75 66.8±5.5 10.4±2.4 16.5±3.2  83.7±6.1 56.3±3.3 57.0±5.2
36.25 87.5±35.4 20.0±2.7 28.0±5.6  ⋯ 71.5±4.0 71.8±6.2
37.75  ⋯  55.3±3.1  ⋯  ⋯ 81.2±5.1  ⋯
38.25  ⋯  85.1±5.5  ⋯  ⋯ 85.6±6.1  ⋯