The overpic environment with absolute positioning^{1}

Insert before:

\usepackage[abs]{overpic}
...
\setlength\unitlength{1mm}
and/or local option unit=...

The original graphic from GhostScript:

\includegraphics[scale=.25]{golfer.ps}

0 5 10 15 20 25 30 35 40 45 50 0 5 10 15 20 25 30 35 40 45 50 0 5 10 15 20 25 30 35 40 45 50 55 60 0 5 10 15 20 25 30 35 40 45 50 55 60

A grid for orientation:

\begin{overpic}[scale=.25,grid,tics=5]%
      {golfer.ps}
\end{overpic}

(default for tics is 10)

L^{A}TEX

Positioning the L^{A}TEX output with \put commands:

\begin{overpic}[scale=.25,unit=1mm]%
      {golfer.ps}
  \put(3,28){\huge \LaTeX}
  \put(34,5){\includegraphics[scale=.07]%
      {golfer.ps}}
\end{overpic}

(default for unit is \unitlength)

1Version 0.5, Rolf Niepraschk, 11/97, file: overpic.sty