Mon. Not. R. Astron. Soc. 000, 000–000 (1994)  Printed 29 April 1996  (MN plain TEX macros v1.5)

Figure 4. Photometric comparisons in the overlap areas between the fields. The differences between photometry of individual images from different fields for the overlapping fields 52–51, 50–51, 50–28 and 30–29 are shown for the B_{J} and R wavebands. The axes are as follows. Left-hand panels: ΔB (−1 to 1) against ⟨B⟩ (13 to 21). Right-hand panels: ΔR (−1 to 1) against ⟨R⟩ (12 to 20).

This paper has been produced using the Royal Astronomical Society/Blackwell Science TEX macros.

Landscape material to be pasted into the article.