KUIP CERN Program Library I202 Author(s) : R. Brun, P. Zanarini Library: PACKLIB Submitter : Submitted: 10.02.1988 Language : Fortran Revised: 17.12.1991 KUIP - Kit for a User Interface Package The KUIP package is part of PAW (Q121) (Physics Analysis Workstation), but can be used independently.

KUIP is an interface program for any application based on interactive input of commands. From the appli-

cation it is seen as a slave which supplies the next command with its associated parameters. It takes care of program input in various (e.g., graphics or menu) forms and performs preliminary checking on command syntax and parameters. Structure:

SUBROUTINE subprograms

Usage:

See Long Write-up. ffl

1 I202 Ű 1