FFREAD CERN Program Library I302

Author(s) : See below Library: PACKLIB Submitter : J.C. Lassalle Submitted: 30.01.1980 Language : Fortran Revised: 17.12.1991 Format-Free Input Processing

Authors: R. Brun, R. Hagelberg, M. Hansroul, I. Ivanchenko, J.C. Lassalle, G. Misuri, J. Vorbrueggen

OBSOLETE Please note that this routine has been obsoleted in CNL 219. Users are advised not to use it any longer and to replace it in older programs. No maintenance for it will take place and it will eventually disappear.

Suggested replacement: KUIP (I202)

FFREAD provides the user with a facility for free-format data input, providing a suitable tool to transmit

and/or modify variables at run-time without recompilation.

Structure:

SUBROUTINE subprograms

User Entry Names: FFREAD, FFINIT, FFSET, FFKEY, FFGO, FFGET Internal Entry Names: FFCARD, FFFIND, FFGOR, FFSKIP, FFUPCA Files Referenced: Input, Output (both default or user de^ned) External References: UCOPY (V301), UCTOH (M409), UHTOC (M409), FFUSER (()optionally user-supplied)

Usage:

See Long Write-up. ffl

1 I302 Ű 1