COMIS CERN Program Library L210 Author(s) : V. Berezhnoi, R. Brun, S. Nikitin, Y. Petrovykh, V. Sikolenko Library: PACKLIB Submitter : R. Brun Submitted: 10.02.1988 Language : Fortran Revised: COMIS - Compilation and Interpretation System The COMIS package is part of PAW (Q121) (Physics Analysis Workstation), but can be used independently. It is a Fortran interpreter with which the user can interactively de^ne, edit and execute any Fortran routines without recompiling and relinking. A small user interface system is part of COMIS and an interface with the local editor is also provided. Structure:

SUBROUTINE subprograms

Usage:

See Long Write-up. ffl

1 L210 Ű 1