IUSAME CERN Program Library M501

Author(s) : C. Letertre Library: KERNLIB Submitter : Submitted: 21.08.1971 Language : Fortran or Assembler Revised: 15.09.1978 Locating a String of Same Words

IUSAME locates the ^rst of a continuous sequence of identical words occuring at least a given number of

times. It returns the number of contiguous identical words in the sequence. Structure:

FUNCTION subprogram

User Entry Names: IUSAME Usage:

   NSAME = IUSAME(VECT,JL,JR,MIN,JSAME)

VECT(JL) Start of the portion of the vector to be analysed.
VECT(JR) End of the portion of the vector to be analysed.
MIN Minimum length of a string to be considered a string.

The function returns the length of the string as function value, and also the position of the ^rst element of the string: VECT(JSAME).

If no string of at least MIN elements has been found starting at or after VECT(JL), the function returns

NSAME = 0 and JSAME = JR + 1.

ffl

1 M501 Ű 1