TRACEQ CERN Program Library N105

Author(s) : J. Zoll Library: KERNLIB Submitter : Submitted: 01.12. 1973 Language : Fortran Revised: 15.09.1978 Print Trace-Back

TRACEQ prints the Fortran trace-back leading to TRACEQ. The maximum number of trace-back levels is

speci^ed as an argument. Fewer levels may be printed either because the main program has been reached or because the trace-back linkage is invalid.

Structure:

SUBROUTINE subprogram

User Entry Names: TRACEQ Internal Entry Names: TRAC1Q, TRAC2Q Files Referenced: User de^ned

COMMON Block Names and Lengths: /SLATE/ 40

Usage:

   CALL TRACEQ(LUN,N)

LUN Logical unit number of the print ^le, LUN = 0 is accepted to mean the standard print ^le.
N Maximum number of trace-back levels to be printed.

Notes:

The implementation of TRACEQ depends on the machine; on some machines this cannot be done at all and the routine is a dummy. On some other machines the unit for printing or the number of levels printed is not under program control. ffl

1 N105 Ű 1