HIGZ CERN Program Library Q120

Author(s) : O. Couet Library: GRAFLIB Submitter : Submitted: 10.02.1988 Language : Fortran and C Revised: 01.11.1994 High Level Interface to Graphics and Zebra

The HIGZ package is part of PAW (Q121) (Physics Analysis Workstation), but can be used independently.

HIGZ contains entries which look and act like many of the entries of GKS (Graphics Kernel System) and, in

addition, has entries providing a higher level of functionality such as plotting whole histograms. HIGZ also contains an option to create a device independent meta^le stored in ZEBRA (Q100) format which can hence be ported, and re-interpreted, on other machines and operating systems. The complete HIGZ facilities are available in the PAW (Q121) system.

Structure:

SUBROUTINE subprograms

Usage:

See Long Write-up. ffl

1 Q120 Ű 1