HPLOT CERN Program Library Y251 Author(s) : O. Couet Library: GRAFLIB Submitter : Submitted: 01.03.1976 Language : Fortran Revised: 01.11.1994 HPLOT : HBOOK Graphics Interface for Histogram Plotting

HPLOT is a FORTRAN-callable facility for producing HBOOK (Y250) output on all kind of graphic devices. The

output is of a quality suitable for publications. Structure:

SUBROUTINE subprograms

Usage:

A full description of the system is given in the HIGZ-HPLOT Manual (Q120, Y251). The full HPLOT facilities are available in the PAW (Q121) system. ffl

1 Y251 Ű 1