KERNGT CERN Program Library Z001 Author(s) : J. Zoll Library: KERNLIB Submitter : Submitted: 19.09.1991 Language : Fortran Revised: Print KERNLIB Version Numbers

KERNGT prints the titles of the PAM-^les which have been used to make the general part of KERNLIB.

Structure:

SUBROUTINE subprogram

User Entry Names: KERNGT Files Referenced: Parameter Usage:

CALL KERNGT(LUN)

with:

LUN Fortran logical unit number for printing, if zero: use ’standard output’.

Examples:

CALL KERNGT(0)

gives something like:

KERNGT. KERNLIB from: KERNAPO 1.23 910719 13.00
                     KERNFOR 4.29 910731 19.17

ffl

1 Z001 Ű 1