IARGC CERN Program Library Z264 Author(s) : F. Carminati, M. Marquina Library: KERNLIB or Fortran Run-Time Library Submitter : Submitted: 13.07.1988 Language : Fortran + C Revised: 15.03.1993 Returns Command Line Arguments

IARGC is used to return arguments that the user has given to an executable module on the command line.

Structure:

FUNCTION subprograms

User Entry Names: GETARG, IARGC Usage:

NPAR = IARGC()

sets NPAR to the number of blank delimited arguments present after the program name on the command line.

NPAR and IARGC are of type INTEGER.
   CALL GETARG(IARG,GOTEXT)
IARG (INTEGER) Contains, on entry, the number of the argument to retrieve. Unchanged on exit.
GOTEXT (CHARACTER) Contains, on exit, the IARG-th argument.

Notes:

1. Arguments surrounded by double quotes (") are treated as single, e.g.

"a variable here"

is equivalent to one argument.

2. On VM/CMS, due to technical restrictions, at least one of the routines must be called before any I/O (typically a PRINT statement).

3. GETARG(0,GOTEXT) returns name of executing program (not VM). Example:

   CHARACTER*100 STRING
C
C-- Retrieve the number of arguments given to this program
C
   NPAR=IARGC()
C-- and then get one by one, storing it in STRING
   DO 10 N = 1,NPAR
   CALL GETARG(N,STRING)
   PRINT *, STRING(1:LENOCC(STRING))
 10 CONTINUE
   END

ffl 1 Z264 Ű 1