WHOAMI CERN Program Library Z266 Author(s) : F. Carminati, J. Zoll Library: KERNLIB, VAX only Submitter : Submitted: 01.04.1994 Language : Fortran Revised: Get the name of the executing module This routine will ^gure out the path-name of the executing image. On the VAX this is done with a system call, on UNIX by scanning the search path until it ^nds the module whose name is in argv[0]. Structure:

SUBROUTINE subprograms

User Entry Names: WHOAMI Common Blocks: COMMON /SLATE/ ND,NE,NF,DUMMY(37) Usage:

CALL WHOAMI(NAME)

On exit, NAME contains the full path-name of the module. Status and various lengths are returned in /SLATE/:

ND = 0 if the call failed,
   > 0 the number of characters in the path-name

On the VAX:

ND = number of characters in the path-name with .EXE;n stripped
NE = number of characters before the semicolon,
NF = number of characters in the complete name.

For example:

if NAME is DISK:[CERN]WYLBUR.EXE;4
          _:.=+=.: 1_:.=+=.: 2_:.=+=
we will get ND=17, NE=21, NF=23.

Note: At the moment this is available only on the VAX; the code exists for UNIX but is not yet in the library. ffl

1 Z266 Ű 1