TMREAD CERN Program Library Z313 Author(s) : J. Zoll Library: KERNLIB Submitter : Submitted: 01.11.1994 Language : Fortran Revised: Terminal Dialogue Routines These routines prompt the user on-line to the executing program for input from the terminal, and read it. The prompt is written to standard output by calling TMPRO, the input is read from standard input with TMREAD. Whether or not standard input is in fact a terminal can be detected with INTRAC (Z044); if it is not the call to TMPRO should be by-passed. Structure:

SUBROUTINE subprograms

User Entry Names: TMINIT, TMPRO, TMREAD Files references: standard input, standard output Usage:

Initialize the dialogue On some machines it is necessary to switch off buffered mode on standard output, this is done by calling once, and before the ^rst call to TMPRO:

CALL TMINIT (IFINIT)
    IFINIT* is reset to non-zero by TMINIT

Put the prompt to standard output

CALL TMPRO (TEXT)
      TEXT is the character string to be written

Read next line from standard input

CALL TMREAD (MAXCH, CHLINE, NCH, ISTAT)
     MAXCH maximum number of char. to be stored into LINE
      LINE* text read, of type CHARACTER
       NCH* number of characters read into LINE
     ISTAT* status returned:
             = 0 success
             < 0 end-of-file seen
             > 0 read error

ffl

1 Z313 Ű 1