 TK . 1 8927(QDIV2 ) SY/US/IO 0/ 0/ 3 NL/NS/ND 0/ 0/ 12 N/U/O/@O 0/ 8950/ 8905/ 8927
-------- DATA part of bank --------
     1 / -1.523 -2.242 6.423 -1.000 .2408E-03 4.116 .6287E-01 2.370 -.4121 1.538
    11 / 1.165 .3159E-09

DZSHOW +++++ LEVEL 1 ++++++++++ Store MainStor at absolute address 40019F30 ++++++++++

 VX . 1 9039(QDIV2 ) SY/US/IO 0/ 0/ 1A3 NL/NS/ND 1/ 1/ 12 N/U/O/@O 0/ 9069/ 8950/ 9039
-------- LINK part of bank --------
     1 / 8972
-------- DATA part of bank --------
     1 / 100 1 2 1.000 .2888 29.85 10.06 .9985 .0000E+00 7.841
    11 / .2795 1.156

DZSHOW +++++ LEVEL 2 ++++++++++ Store MainStor at absolute address 40019F30 ++++++++++

 TK . 3 8972(QDIV2 ) SY/US/IO 0/ 0/ 3 NL/NS/ND 0/ 0/ 12 N/U/O/@O 8994/ 9039/ 9038/ 8972
-------- DATA part of bank --------
     1 / -.2253E-01 -.9254E-01 .2496 1.000 -.6851E-02 4.474 -4.954 2.620 -12.55 1.304
    11 / 1.672 .3295E-06
 TK . 2 8994(QDIV2 ) SY/US/IO 0/ 0/ 3 NL/NS/ND 0/ 0/ 12 N/U/O/@O 9016/ 9039/ 8972/ 8994
-------- DATA part of bank --------
     1 / .9680 1.493 -4.145 1.000 -.3668E-03 .9954 -.9005E-01 -2.330 .6798 145.7
    11 / 22.78 .3943E-10
 TK . 1 9016(QDIV2 ) SY/US/IO 0/ 0/ 3 NL/NS/ND 0/ 0/ 12 N/U/O/@O 0/ 9039/ 8994/ 9016
-------- DATA part of bank --------
     1 / -1.523 -2.242 6.423 -1.000 .2408E-03 4.116 .6287E-01 2.370 -.4121 1.538
    11 / 1.165 .3159E-09

DZSTOR --- Dump of store //

 --- Store Parameters ---
Id Name Abs.addr. Length Fence NS NL WS Min.Resv. Act.Resv. Min(1+2) Low High
 0 MainStor 40019F30 9998 2 1 0 0 164 8542 2000 2 0

 --- Division parameters ---

   DIVISION START END MAX KIND MODE WIPES GARB. GARB. PUSHES LIVE BANKS DROPPED BANKS BANKS TOTAL
 NB. NAME ADDRESS ADDRESS LENGTH SYST. FREE NUMB. LENGTH NUMB. LENGTH NUMB. LENGTH
==============================================================================================================================
  1 QDIV1 2 1 0 U/EVENT FORWD 0 0 0 0 0 0 0 0 0 0