!!!!! ZFATAL reached from for Case= 0

        IQUEST(11) = 0 0
        IQUEST(12) = 2 2
        IQUEST(13) = 8993 2321
        IQUEST(14) = 9039 234F
        IQUEST(15) = 1 1
        IQUEST(16) = 1 1
        IQUEST(17) = 12 C
        IQUEST(18) = 0 0
        IQUEST(19) = 0 0
        IQUEST(20) = 9039 234F
        IQUEST(21) = 9038 234E
        IQUEST(22) = 0 0
        IQUEST(23) = ********* 41A00000 A
        IQUEST(24) = 0 0
        IQUEST(25) = 0 0
        IQUEST(26) = 0 0
        IQUEST(27) = 0 0
        IQUEST(28) = 0 0
        IQUEST(29) = 0 0
        IQUEST(30) = 0 0
        IQUEST(31) = 1 1

        Current Store number = 0 (JQDIVI= 2)

ZEBRA SYSTEM Post-Mortem from ZPOSTM.

/QUEST/
           1 538976288 538979633 824188960 6 1 3 2
           0 3 0 2 8993 9039 1 1
          12 0 0 9039 9038 0 1101004800 0
           0 0 0 0 0 0 1 2
           0 0 0 0 0 0 0 0
           1 20202020 20202D31 31202020 6 1 3 2
           0 3 0 2 2321 234F 1 1
           C 0 0 234F 234E 0 41A00000 0
           0 0 0 0 0 0 1 2
           0 0 0 0 0 0 0 0